0

0.01

0.02

0.03

0.04

0 5 1 0 1 5 2 0 2 5

Pluto

Plane-parallel and Curtis-Godson approximations, no limb darkening Exact solution, no limb darkening Exact solution, Minnaert parameter = 0.6

Equivalent Width (cm^{-1})

Gaseous CO Mole Fraction (%)

Isothermal (PL1) Observed 3-� upper limit

Young et al. Fig. 3