0.001

0.01

0.1 PLUTO

Isothermal (PL1) Inversion (PL2) Troposphere (PL3)

Equivalent Width (cm^{�1})

Observed 3-� upper limit

Ideal Solution

Detailed Balance

Intimate Mixture

PL3 PL1

0.001

0.01

0.1

0.001 0.01 0.1 1 1 0 100

TRITON

1989 Voyager (TR1) 1997 Occultation (TR2)

Equivalent Width (cm^{�1})

Gaseous CO Mole Fraction (%)

Observed 3-� upper limit

Ideal Solution

Detailed Balance

Intimate Mixture

TR2

TR1

B89

S95

Young et al. Fig. 4