30Table II. Summary of occultation results.Half-light timeth

v^^

at half-lightHhrh (km)nh (1013 cmÐ3)aT (K)4:02:27.17 ± 0.9825870.2± 6.825952.7± 7.6 27.30116.7± 7.9