Table 2: Composition Models^† Model C_2H_2 C_2H_6 Temp. f_{10} f_{20} γ f_{10} f_{20} γ Profile A 2.5 × 10^{−6} 3.0 × 10^{−9} 0.9 2.0 × 10^{−5} 4.0 × 10^{−7} 0.80 med B 5.0 × 10^{−7} 1.4 × 10^{−9} 1.2 2.0 × 10^{−5} 4.0 × 10^{−7} 0.80 med C 2.0 × 10^{−4} 3.0 × 10^{−9} 0.6 2.0 × 10^{−5} 4.0 × 10^{−7} 0.80 med D 5.0 × 10^{−8} 9.0 × 10^{−9} 1.2 2.0 × 10^{−5} 4.0 × 10^{−7} 0.80 med E 1.0 × 10^{−5} 9.0 × 10^{−9} 0.6 2.0 × 10^{−5} 4.0 × 10^{−7} 0.80 med F 5.0 × 10^{−6} 1.4 × 10^{−9} 1.2 4.0 × 10^{−5} 1.2 × 10^{−6} 0.60 cold G 4.0 × 10^{−4} 5.0 × 10^{−9} 0.6 4.0 × 10^{−5} 1.2 × 10^{−7} 0.60 cold H 2.0 × 10^{−7} 3.0 × 10^{−8} 1.2 4.0 × 10^{−5} 1.2 × 10^{−7} 0.60 cold I 2.0 × 10^{−5} 1.0 × 10^{−8} 0.6 4.0 × 10^{−5} 1.2 × 10^{−7} 0.60 cold J 1.0 × 10^{−7} 1.4 × 10^{−9} 1.2 1.6 × 10^{−5} 3.0 × 10^{−7} 0.80 hot K 3.0 × 10^{−5} 5.0 × 10^{−9} 0.6 1.6 × 10^{−5} 3.0 × 10^{−7} 0.80 hot L 3.5 × 10^{−8} 9.0 × 10^{−9} 1.2 1.6 × 10^{−5} 3.0 × 10^{−7} 0.80 hot M 3.0 × 10^{−7} 8.0 × 10^{−9} 0.6 1.6 × 10^{−5} 3.0 × 10^{−7} 0.80 hot N 2.5 × 10^{−6} 3.0 × 10^{−9} 0.9 3.5 × 10^{−5} 1.0 × 10^{−6} 0.47 med O 2.5 × 10^{−6} 3.0 × 10^{−9} 0.9 4.0 × 10^{−5} 7.0 × 10^{−7} 0.60 med P 2.5 × 10^{−6} 1.4 × 10^{−9} 0.9 6.0 × 10^{−5} 1.5 × 10^{−6} 0.40 med Q 3.5 × 10^{−6} 4.5 × 10^{−9} 0.9 4.0 × 10^{−5} 1.2 × 10^{−6} 0.60 cold R 3.5 × 10^{−6} 2.0 × 10^{−9} 0.9 1.6 × 10^{−5} 3.0 × 10^{−7} 0.80 hot

†All models use p_0=0.001 mbar and K(p_0)=7 × 10^5 cm^2s^{−1}.