.

C

D

E

F

18:45:50

18:46

18:46:10

18:46:20

-19:44

-19:40

-19:38

18:45:40 18:45:30 -19:36

-19:42

-19:46

DENIS.I.8184-1370507

1’ 10.61’ x 10.68’

N

E Powered by Aladin